dSelect Wiring File
 
This menu displays all currently available wirings. If you wish
to create a new wiring, press "A". If you wish to edit a wiring,
select the wiring and press "E". If you wish to delete a wiring,
select the wiring and press "D". Press Escape to exit.
 
eDescription
 
This option allows you to change or give the wiring a descriptive
name of up to 30 characters. This name is only used for your
reference.
 
fGutter
 
This option allows you to specify the gutter between the displayed
devices. The number may range from 0 to 255 and indicates the
number of blank pixel lines to be left between devices.
 
gDevice List
 
This option allows you to specify which devices you wish to use
and the order in which they should be displayed. All devices 
selected for this wiring are listed in the order to be displayed.
If you wish to add a device to the list, press "A". If you wish
to delete a device from the list, press "D". If you wish to move
a device to another location on the list, press "M". Press Escape
when done.
 
hAdd Wiring
 
Please enter the name of the new wiring you wish to create. Do
not enter an extension. The extension ".WIR" will be given.

iAdd Device

Select the device you wish to add from the list. Press Enter
when done or Esc to abort.


